<template>
    <div class="test">
        nim-test
        <input v-model="info"/>
        <button @click="onPost">发送</button>
    </div>
</template>

<script>
import NIM from '@yxim/nim-web-sdk/dist/SDK/NIM_Web_NIM.js'
import { showNotify  } from 'vant'

export default {
    data() {
        return {
            nim: null,
            // 是否已连接
            isConnect: false
        }
    },
    computed: {
        accountId() {
            return this.$route.query.accountId
        }
    },
    async created() {
        this.isConnect = false
        this.nim = NIM.getInstance({
            debug: true,
            appKey: '6c51376a55f54b2fa586d7b4c85757f8',
            account: this.accountId,
            token: '123456',
            onconnect: function() {
                console.log('连接成功 ================>')
                this.isConnect = true
            },
            onwillreconnect: function(obj) {
                console.log('即将重连')
                console.log(obj.retryCount)
                console.log(obj.duration)
            },
            ondisconnect: function(error) {
                showNotify({ type: 'warning', message: '连接失败' })
                // if (error) {
                //     switch (error.code) {
                //         case 302:
                //             console.warn('账号或者密码错误')
                //             break
                //     }
                // }
            },
            onmsg: function (msg) {
                console.log('收到新消息===========>', msg);
            }
        });
    },
    methods: {
        async onPost() {
            let msg = this.nim.sendText({
                scene: 'p2p',
                to: '18987175004',
                text: 'hello',
                done: function sendMsgDone (error, msg) {
                    console.log('sendText', error, msg)
                }
            })
            console.log('发送的消息===========>', msg)
        }
    },
    beforeUnmount() {
        if (this.nim) {
            this.nim.destroy({
                done: function (err) {
                    console.log('nim 断开连接')
                }
            })
        }
        
    }
}
</script>

<style lang="less" scoped>

</style>
